Dr. Rima warned of a planned pandemic back in 2009? – [VIDEO]

‘The World Health Organization decided that the world had 90% too many people’

WATCH HERE: https://rumble.com/vq16k5-back-in-2009-dr.-rima-warned-of-a-planned-pandemic.html